Center at RA 21 20 27.0000000 DEC -51 03 02.000000

CONT: 2116-512 IPOL 8349.938 MHZ 2116-512.ICL001.2

Cont peak flux = 6.5548E-02 JY/BEAM Levs = 3.022E-03 * (4, 8, 16)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100