Center at RA 19 47 21.3000000 DEC -35 42 01.000000

CONT: 1944-358 IPOL 8349.938 MHZ 1944-358.ICL001.4

Cont peak flux = 3.2270E-02 JY/BEAM Levs = 2.179E-03 * (4, 8)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100