Center at RA 19 42 45.4999999 DEC -70 15 53.000000

CONT: 1937-703 IPOL 8349.938 MHZ 1937-703.ICL001.3

Cont peak flux = 1.0374E-01 JY/BEAM Levs = 7.390E-04 * (4, 8, 16, 32, 64, 128)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40