Center at RA 16 17 49.2760001 DEC -77 17 18.470000

CONT: 1610-771 IPOL 8349.938 MHZ 1610-771.ICL001.5

Cont peak flux = 1.2912E+00 JY/BEAM Levs = 5.176E-03 * (4, 8, 16, 32, 64, 128)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100