Center at RA 12 39 46.6510001 DEC -68 45 30.890000

CONT: 1236-684 IPOL 8349.938 MHZ 1236-684.ICL001.4

Cont peak flux = 1.9053E-01 JY/BEAM Levs = 2.851E-03 * (4, 8, 16, 32, 64)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40