Center at RA 09 11 06.7000001 DEC -47 24 44.000000

CONT: 0909-472 IPOL 8349.938 MHZ 0909-472.ICL001.3

Cont peak flux = 8.1373E-02 JY/BEAM Levs = 9.329E-04 * (4, 8, 16, 32, 64)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40