Gain amp vs UTC time for BF025B.FQ-1.1 SN 1 Rpol IF 1 - 4

Plot file version 1 created 03-FEB-2006 16:26:41

1R BR IF 1

1010 1005 1000 995 990 1R BR IF 2

1010 1005 1000 995 990 1R BR IF 3

1010 1005 1000 995 990 1R BR IF 4

MilliGain

1010 1005 1000 995 990 2R FD IF 1

1010 1005 1000 995 990 2R FD IF 2

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10

1010 1005 1000 995 990

Gain amp vs UTC time for BF025B.FQ-1.1 SN 1 Rpol IF 1 - 4

Plot file version 2 created 03-FEB-2006 16:26:41

2R FD IF 3

1010 1005 1000 995 990 2R FD IF 4

1010 1005 1000 995 990 3R HN IF 1

1010 1005 1000 995 990 3R HN IF 2

MilliGain

1010 1005 1000 995 990 3R HN IF 3

1010 1005 1000 995 990 3R HN IF 4

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10

1010 1005 1000 995 990

Gain amp vs UTC time for BF025B.FQ-1.1 SN 1 Rpol IF 1 - 4

Plot file version 3 created 03-FEB-2006 16:26:42

4R KP IF 1

1000 995 990 985 4R KP IF 2

1000 995 990 4R KP IF 3

1010 1005 1000 995 990 4R KP IF 4

MilliGain

1010 1005 1000 995 990 5R LA IF 1

1000 995 990 5R LA IF 2

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10

1002 1000 998 996 994 992

Gain amp vs UTC time for BF025B.FQ-1.1 SN 1 Rpol IF 1 - 4

Plot file version 4 created 03-FEB-2006 16:26:42

5R LA IF 3

1005

1000 995 5R LA IF 4

1004 1002 1000 998 996 994 6R MK IF 1

1010 1000 990 6R MK IF 2

MilliGain

1010 1000 990 6R MK IF 3

1010 1000 990 6R MK IF 4

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10

1010 1000 990

Gain amp vs UTC time for BF025B.FQ-1.1 SN 1 Rpol IF 1 - 4

Plot file version 5 created 03-FEB-2006 16:26:42

7R NL IF 1

1000 995 990 985 980 7R NL IF 2

1000 995 990 985 980 7R NL IF 3

1005 1000 995 990 985 7R NL IF 4

MilliGain

1000 990 980 8R OV IF 1

1010 1005 1000 995 990 8R OV IF 2

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10

1010 1005 1000 995 990

Gain amp vs UTC time for BF025B.FQ-1.1 SN 1 Rpol IF 1 - 4

Plot file version 6 created 03-FEB-2006 16:26:42

8R OV IF 3

1010 1005 1000 995 990 8R OV IF 4

1010 1005 1000 995 990 9R PT IF 1

1010 1005 1000 995 990 9R PT IF 2

MilliGain

1010 1005 1000 995 990 9R PT IF 3

1010 1005 1000 995 990 9R PT IF 4

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10

1005

1000 995 990

Gain amp vs UTC time for BF025B.FQ-1.1 SN 1 Rpol IF 1 - 4

Plot file version 7 created 03-FEB-2006 16:26:42

10R SC IF 1

1010 1005 1000 995 990 10R SC IF 2

1010 1005 1000 995 990 10R SC IF 3

1010 1005 1000 995 990 10R SC IF 4

MilliGain

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10

1010 1005 1000 995 990